-- 慢查询日志表
CREATE TABLE IF NOT EXISTS sys_slow_query_log (
    id BIGINT AUTO_INCREMENT PRIMARY KEY,
    method_name VARCHAR(200) NOT NULL COMMENT '方法名',
    execution_time BIGINT NOT NULL COMMENT '执行时间（ms）',
    threshold BIGINT NOT NULL COMMENT '阈值（ms）',
    params TEXT COMMENT '请求参数',
    create_time DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    INDEX idx_method_name (method_name),
    INDEX idx_execution_time (execution_time),
    INDEX idx_create_time (create_time)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='慢查询日志表';
